en	Main URL to call the frontend in default language. Can be https://www.example.com/ or just /, if it is just a / you cannot rely on TYPO3 creating full URLs

en	For example "https://staging.domain.tld" or "http://www.domain.local"

en	Expression to match this base variant.

en	This allows you to specify variants of the site's base. Can be used, for example, if you have a different domain for your staging environment.

en	Make sure to have at least 0 (not defined otherwise) configured in order to serve helpful error messages to your visitors.

en	Path to the fluid template file given by absolute, relative path (from site root) or by referring the template file inside an extension with "EXT:" prefix.

en	Fully qualified class name to a class that implements the PageErrorHandlerInterface.

en	This name will be used to create the configuration directory. Mind the recommendations for directory names (only a-z,0-9,_,-) and make it unique.

en	Use a full qualified domain "https://www.mydomain.fr/" or "/fr/". Use "/" to keep the main URL for the default language. Add language specific suffixes to use those, or configure complete URLs for independent domains.

en	Language direction for "dir" attribute

en	Used within for "lang" and "hreflang" attributes

en	ISO 639-1 code of the Language

en	Used for localized date and currency formats. E.g. "de_DE" or "en_US.UTF-8".

en	Used within language-related menus

en	Select the language to be used from translation files. Keep default if no translation files are available.

en	You must create a page with a site root flag.