en	Add new site configuration for this site

en	Base URLs

en	Configuration Folder

en	Delete site configuration

en	Full URL prefix

en	Please add at least one page through the Page module.

en	No pages found!

en	This site does not have a configuration, yet.

en	Site

en	Site Configuration

en	The following sites don't belong to any page anymore and can be removed.

en	Unassigned site configurations

en	Two error handler configurations for error code "%1s" found. This would be an invalid configuration, the dangling one has been removed.

en	Duplicate error code removed

en	Two language configurations for language "%1s" found. This would be an invalid configuration, the dangling one has been removed.

en	Two language configurations for language "%1s" found. This would be an invalid configuration, the dangling one has been removed.

en	Duplicate language configuration removed

en	Given site identifier "%1s" already exists and points to a different site. The existing identifier "%2s" for this site is kept.';

en	Identifier not changed

en	Given site identifier "%1s" already exists. It has been renamed to "%2s". Maybe you want to edit the site again and give it a better name.

en	Renamed identifier

en	Field "%1s" is a required field, but no value has been provided.

en	Site configuration not saved